<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">Since the mid-1990s, humans have taken an unprecedented step in Earthly
annals by introducing not just exotic flora or fauna from one ecosystem
into another, but actually inserting exotic genes into the operating
systems of individual plants and animals, where they're intended to do
exactly the same thing: copy themselves, over and over.
</pre></body></html>